(module TP20R (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr smd)
  (fp_text reference >NAME (at 2.17424 -1.68402) (layer F.SilkS))
  (fp_text value >VALUE (at -0.6858 1.0033) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 7.49808 2.03962) (layer F.SilkS))
  (pad TP smd circle (at 0 0) (size 1.99898 1.99898) (layers F.Cu F.Paste F.Mask))
)
