(module TP17R (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr smd)
  (fp_text reference >NAME (at 2.3241 -1.53416) (layer F.SilkS))
  (fp_text value >VALUE (at -0.5588 0.8763) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 7.49808 2.03962) (layer F.SilkS))
  (pad TP smd circle (at 0 0) (size 1.69926 1.69926) (layers F.Cu F.Paste F.Mask))
)
