(module TP14SQ (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr smd)
  (fp_text reference >NAME (at 2.47396 -1.3843) (layer F.SilkS))
  (fp_text value >VALUE (at -0.5588 0.7493) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 7.49808 2.03962) (layer F.SilkS))
  (pad TP smd rect (at 0 0) (size 1.39954 1.39954) (layers F.Cu F.Paste F.Mask))
)
