(module TP12SQ (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr smd)
  (fp_text reference >NAME (at 2.57302 -1.2827) (layer F.SilkS))
  (fp_text value >VALUE (at -0.4318 0.6223) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 7.49808 2.03962) (layer F.SilkS))
  (pad TP smd rect (at 0 0) (size 1.19888 1.19888) (layers F.Cu F.Paste F.Mask))
)
