(module TP08SQ (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr smd)
  (fp_text reference >NAME (at 2.87274 -1.03378) (layer F.SilkS))
  (fp_text value >VALUE (at -0.3048 0.4953) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 7.49808 1.40462) (layer F.SilkS))
  (pad TP smd rect (at 0 0) (size 0.79756 0.79756) (layers F.Cu F.Paste F.Mask))
)
