(module P1-20Y (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr virtual)
  (fp_text reference >NAME (at 1.905 -3.429) (layer F.SilkS))
  (fp_text value >VALUE (at 0.0762 -0.0127) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 6.22808 3.94462) (layer F.SilkS))
  (pad TP thru_hole oval (at 0 0 180) (size 2.54 5.08) (drill 2.0066) (layers *.Cu *.Paste *.Mask))
)
