(module P1-20 (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr virtual)
  (fp_text reference >NAME (at 1.651 -2.413) (layer F.SilkS))
  (fp_text value >VALUE (at 0.0762 -0.0127) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 6.22808 2.67462) (layer F.SilkS))
  (pad TP thru_hole circle (at 0 0) (size 3.1496 6.2992) (drill 2.0066) (layers *.Cu *.Paste *.Mask))
)
