(module P1-13Y (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr virtual)
  (fp_text reference >NAME (at 2.286 -2.794) (layer F.SilkS))
  (fp_text value >VALUE (at 0.0762 -0.0127) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 6.22808 3.30962) (layer F.SilkS))
  (pad TP thru_hole oval (at 0 0 180) (size 1.905 3.81) (drill 1.3208) (layers *.Cu *.Paste *.Mask))
)
