(module B2_54 (layer F.Cu) (tedit 200000)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr smd)
  (fp_text reference >NAME (at 1.905 -2.286) (layer F.SilkS))
  (fp_text value >VALUE (at -1.1938 1.3843) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 6.22808 2.67462) (layer F.SilkS))
  (pad TP smd circle (at 0 0) (size 2.54 2.54) (layers F.Cu F.Paste F.Mask))
)
