(module B1_27 (layer F.Cu) (tedit 59927130)
  (descr "TEST PAD")
  (tags "TEST PAD")
  (attr smd)
  (fp_text reference >NAME (at 2.54 -1.651) (layer F.SilkS))
  (fp_text value >VALUE (at -0.5588 0.7493) (layer F.SilkS))
  (fp_text user >TP_SIGNAL_NAME (at 6.86308 1.40462) (layer F.SilkS) hide)
  (pad TP smd circle (at 0 0) (size 1.27 1.27) (layers F.Cu F.Mask))
)
